/*
 * Licensed to the Apache Software Foundation (ASF) under one or more
 * contributor license agreements.  See the NOTICE file distributed with
 * this work for additional information regarding copyright ownership.
 * The ASF licenses this file to You under the Apache License, Version 2.0
 * (the "License"); you may not use this file except in compliance with
 * the License.  You may obtain a copy of the License at
 *
 *     http://www.apache.org/licenses/LICENSE-2.0
 *
 * Unless required by applicable law or agreed to in writing, software
 * distributed under the License is distributed on an "AS IS" BASIS,
 * WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
 * See the License for the specific language governing permissions and
 * limitations under the License.
 */
 
DROP TABLE IF EXISTS `undo_log`;
CREATE TABLE `undo_log`
(
    `id`            bigint(20) NOT NULL AUTO_INCREMENT,
    `branch_id`     bigint(20) NOT NULL,
    `xid`           varchar(100) NOT NULL,
    `context`       varchar(128) NOT NULL,
    `rollback_info` longblob     NOT NULL,
    `log_status`    int(11) NOT NULL,
    `log_created`   datetime     NOT NULL,
    `log_modified`  datetime     NOT NULL,
    `ext`           varchar(100) DEFAULT NULL,
    PRIMARY KEY (`id`),
    UNIQUE KEY `ux_undo_log` (`xid`,`branch_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;